\nomenclature{CERN}{Conseil europ\'{e}en pour la recherche nucl\'{e}aire}
\nomenclature{CL}{Confidence level}
\nomenclature{DIRA}{Direction Angle} 
\nomenclature{DOCA}{Distance of closest approach}
\nomenclature{DTF}{Decay Tree Fitter}
\nomenclature{ECAL}{Electromagnetic calorimeter}
\nomenclature{FCNC}{Flavor-changing neutral currents}
\nomenclature{FD}{Flight distance}
\nomenclature{HCAL}{Hadronic calorimeter}
\nomenclature{HLT}{High-level trigger}
\nomenclature{IT}{Inner Tracker} 
\nomenclature{IP}{Impact parameter}
\nomenclature{LCSR}{Light Cone Sum Rule}
\nomenclature{LEP}{Large Electron Positron}
\nomenclature{LHC}{Large Hadron Collider}
\nomenclature{L0}{Level-0}
\nomenclature{LS1}{Long Shutdown 1}
\nomenclature{MAMI}{Mainz microtron}
\nomenclature{MLP}{Multilayer perceptron}
\nomenclature{MVA}{Multi-variate analyis}
\nomenclature{NP}{New Physics}
\nomenclature{OT}{Outer Tracker} 
\nomenclature{PDF}{Probability density function}
\nomenclature{PID}{Particle identification} 
\nomenclature{PHSP}{Phase-space}
\nomenclature{PMT}{Photomultiplier}
\nomenclature{PS}{Preshower}
\nomenclature{QCD}{Quantum chromodynamics}
\nomenclature{QED}{Quantum electrodynamics}
\nomenclature{RICH}{Ring-imagining Cherenkov} 
\nomenclature{SLAC}{Stanford  linear accelerator center}
\nomenclature{SM}{Standard Model}
\nomenclature{SPD}{Scintillating pad detector}
\nomenclature{SPEAR}{Stanford Positron Electron Accelerating Ring}
\nomenclature{TIS}{Triggered independent of signal}
\nomenclature{TOS}{Triggered on signal}
\nomenclature{TMVA}{ Toolkit for Multivariate Data Analysis}
\nomenclature{VELO}{Vertex locator} 
