\section{Systematic uncertainties}

\subsection{Correlations}
\subsection{Statistical uncertanity}
\subsection{Re-weighting of phase-space MC}
\subsection{Bootstrapping of phase-space MC}
\subsection{Angular acceptance parametrization}\label{sec:sys-angAcc}
\subsection{Signal peak mass model}
\subsection{Angular background model}
\subsection{Angular resolution}\label{sec:sys-angRes}
\subsection{Summary of systematic uncertanities}
\subsection[Uncertainty of \texorpdfstring{${\Si{i}}{Si} $} parameters]
{Uncertainty of \texorpdfstring{$\mathbf{\Si{i}}$}{Si} parameters}
\subsection[Uncertainty of \texorpdfstring{${\Pprime{i}}{P prime} $} parameters]
{Uncertainty of \texorpdfstring{$\mathbf{\Pprime{i}}$}{P prime i}  parameters}

\todoFill[inline]{Uncertanities: Fill}

\clearpage    