% The following settings are inspired from
% https://www.semipol.de/2018/06/12/latex-best-practices.html#building-latex-documents

% Filter out acceptable warnings that would otherwise flood the error window
\RequirePackage{silence}
\WarningFilter{scrreprt}{Usage of package `titlesec'}
\WarningFilter{scrreprt}{Activating an ugly workaround}
\WarningFilter{titlesec}{Non standard sectioning command detected}
\WarningFilter{microtype}{protrusion codes list}
\WarningFilter{latexfont}{Font}
\WarningFilter{latexfont}{Some font shapes}

\documentclass[
  paper     = a4,
  fontsize  = 12pt,
  BCOR      = 10mm,
  toc       = listofnumbered,
  numbers   = noenddot,
  headings  = normal,
  listof    = leveldown]{scrbook}

\input{preamble.tex}

\begin{document}

\frontmatter

\input{titlepage}

\input{abstract}
\cleardoublepage

\tableofcontents
\cleardoublepage

\mainmatter
\include{introduction}
\include{lhcb}
\include{scifi}
\include{fee}
%\include{testbeams}
\include{commissioning}
\include{performance}
\include{conclusion}

\printbibliography[heading=bibintoc]
\include{acknowledgements}


\end{document}
